Summary Page Created:Sat November 24, 2007 11:30 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290472

Instrument: HRC Obs ID: 5980 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05980N003 full img2.fits hrcf05980N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 11:30 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290472

Instrument: HRC Obs ID: 5980 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T16:21:28 Date and time of file creation DATE-OBS 2005-09-27T09:25:56 Observation start date DATE-END 2005-09-27T09:51:06 Observation end date RA PNT 332.19926587323 Pointing RA DEC PNT 45.763978119783 Pointing Dec ROLL PNT 221.65037905231 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T16:29:34 Date and time of file creation DATE-OBS 2005-09-27T09:25:56 Observation start date DATE-END 2005-09-27T09:51:06 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5980 Observation id SEQ NUM 290472 Sequence number RA NOM 332.19926587323 Nominal RA DEC NOM 45.763978119783 Nominal Dec ROLL NOM 221.65037905231 Nominal Roll

Summary Page Created:Sat November 24, 2007 11:30 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290472

Instrument: HRC Obs ID: 5980 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169981 45.742414 2984.000000 58.592369 50.928135 332.538519 45.552342 114.315613 23.522711 4.859797 331.926559 45.722411 40.041668 10.921305 3.666381 332.447092 45.576036 62.696552 17.651560 3.551899 332.561795 45.745518 49.386208 14.111434 3.499730 331.867436 45.539330 68.920265 21.326277 3.231706 331.922689 45.584842 56.353741 17.868116 3.153871 332.579656 45.953630 64.760796 20.588926 3.145419 331.876019 45.995961 77.335548 24.639643 3.138664 332.426758 46.008735 63.250000 20.366100 3.105651