Summary Page Created:Sat November 24, 2007 11:30 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290473

Instrument: HRC Obs ID: 5981 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05981N003 full img2.fits hrcf05981N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 11:30 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290473

Instrument: HRC Obs ID: 5981 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T16:21:40 Date and time of file creation DATE-OBS 2005-09-27T09:51:06 Observation start date DATE-END 2005-09-27T10:16:16 Observation end date RA PNT 332.13166995297 Pointing RA DEC PNT 45.766676127285 Pointing Dec ROLL PNT 221.74617327704 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T16:29:44 Date and time of file creation DATE-OBS 2005-09-27T09:51:06 Observation start date DATE-END 2005-09-27T10:16:16 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5981 Observation id SEQ NUM 290473 Sequence number RA NOM 332.13166995297 Nominal RA DEC NOM 45.766676127285 Nominal Dec ROLL NOM 221.74617327704 Nominal Roll

Summary Page Created:Sat November 24, 2007 11:30 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290473

Instrument: HRC Obs ID: 5981 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169948 45.742361 2911.714355 56.729847 51.325966 332.501416 45.907508 84.041664 19.834726 4.237097 332.470920 45.541546 99.780731 23.550783 4.236833 331.800671 45.990444 89.149498 21.660000 4.115859 332.510991 45.965071 98.682846 24.157173 4.085033 332.018018 45.529189 61.541668 15.155571 4.060663 332.484588 45.649998 62.609791 15.915093 3.933988 332.501070 45.844641 64.218185 17.326345 3.706389 331.796408 45.935878 74.416664 20.433998 3.641807 332.491501 45.682352 50.653591 13.947783 3.631659