Summary Page Created:Sat November 24, 2007 11:29 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290474

Instrument: HRC Obs ID: 5982 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05982N003 full img2.fits hrcf05982N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 11:29 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290474

Instrument: HRC Obs ID: 5982 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T16:20:56 Date and time of file creation DATE-OBS 2005-09-27T10:16:16 Observation start date DATE-END 2005-09-27T10:41:26 Observation end date RA PNT 332.12736212421 Pointing RA DEC PNT 45.719232597137 Pointing Dec ROLL PNT 221.7968743899 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T16:28:38 Date and time of file creation DATE-OBS 2005-09-27T10:16:16 Observation start date DATE-END 2005-09-27T10:41:26 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5982 Observation id SEQ NUM 290474 Sequence number RA NOM 332.12736212421 Nominal RA DEC NOM 45.719232597137 Nominal Dec ROLL NOM 221.7968743899 Nominal Roll

Summary Page Created:Sat November 24, 2007 11:29 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290474

Instrument: HRC Obs ID: 5982 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169944 45.742337 3185.142822 58.997288 53.987953 332.336606 45.467576 72.375000 19.039690 3.801270 332.263132 45.967999 63.236439 16.674421 3.792422 332.466802 45.954579 102.869019 27.259964 3.773630 332.261941 45.498289 57.019608 15.642260 3.645228 331.796559 45.936576 83.704315 23.237644 3.602100 331.908876 45.959231 68.916664 19.599092 3.516320 332.310083 45.468254 65.208336 19.079775 3.417668 332.440415 45.958270 85.960136 25.670509 3.348595 332.415338 45.570533 50.208332 15.368419 3.266981