Summary Page Created:Sat November 24, 2007 12:14 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290475

Instrument: HRC Obs ID: 5983 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05983N003 full img2.fits hrcf05983N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 12:14 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290475

Instrument: HRC Obs ID: 5983 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T17:04:50 Date and time of file creation DATE-OBS 2005-09-27T10:41:26 Observation start date DATE-END 2005-09-27T11:06:35 Observation end date RA PNT 332.19567790782 Pointing RA DEC PNT 45.717199178217 Pointing Dec ROLL PNT 221.74336413777 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T17:12:56 Date and time of file creation DATE-OBS 2005-09-27T10:41:26 Observation start date DATE-END 2005-09-27T11:06:35 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5983 Observation id SEQ NUM 290475 Sequence number RA NOM 332.19567790782 Nominal RA DEC NOM 45.717199178217 Nominal Dec ROLL NOM 221.74336413777 Nominal Roll

Summary Page Created:Sat November 24, 2007 12:14 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290475

Instrument: HRC Obs ID: 5983 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169945 45.742373 1662.522705 43.698017 38.045723 332.531054 45.480437 130.388962 25.944693 5.025651 331.864065 45.927806 104.913620 21.491879 4.881547 331.835303 45.526725 97.003319 22.659611 4.280891 331.853497 45.831446 63.770893 16.069382 3.968472 332.568396 45.906393 99.106316 25.243748 3.925975 332.519266 45.954607 95.717606 24.792265 3.860785 332.535139 45.506769 88.857140 23.252451 3.821410 332.555524 45.683638 50.400002 14.305745 3.523060 332.159512 45.928204 48.485050 13.812864 3.510137