Summary Page Created:Sat November 24, 2007 12:15 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290476

Instrument: HRC Obs ID: 5984 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05984N003 full img2.fits hrcf05984N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 12:15 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290476

Instrument: HRC Obs ID: 5984 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T17:05:06 Date and time of file creation DATE-OBS 2005-09-27T11:06:35 Observation start date DATE-END 2005-09-27T11:31:45 Observation end date RA PNT 332.23059926088 Pointing RA DEC PNT 45.738880880857 Pointing Dec ROLL PNT 221.71395847988 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T17:14:07 Date and time of file creation DATE-OBS 2005-09-27T11:06:35 Observation start date DATE-END 2005-09-27T11:31:45 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5984 Observation id SEQ NUM 290476 Sequence number RA NOM 332.23059926088 Nominal RA DEC NOM 45.738880880857 Nominal Dec ROLL NOM 221.71395847988 Nominal Roll

Summary Page Created:Sat November 24, 2007 12:15 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290476

Instrument: HRC Obs ID: 5984 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169908 45.742401 1443.428589 42.549500 33.923515 332.511575 45.486719 110.627907 23.893330 4.630075 332.226164 45.539389 45.107143 12.478099 3.614905 331.868533 45.659323 53.119133 14.761955 3.598381 332.066844 45.501329 53.119133 14.761955 3.598381 332.570295 45.974730 100.563828 28.259405 3.558597 332.406098 45.487666 67.291664 19.017494 3.538409 332.470891 45.848297 42.024109 12.072705 3.480919 332.480117 45.982430 74.788391 21.589556 3.464101 332.053343 45.501137 48.072582 14.502939 3.314678