Summary Page Created:Sat November 24, 2007 12:14 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290477

Instrument: HRC Obs ID: 5985 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05985N003 full img2.fits hrcf05985N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 12:14 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290477

Instrument: HRC Obs ID: 5985 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T17:04:37 Date and time of file creation DATE-OBS 2005-09-27T11:31:45 Observation start date DATE-END 2005-09-27T11:56:56 Observation end date RA PNT 332.16725187086 Pointing RA DEC PNT 45.788648144365 Pointing Dec ROLL PNT 221.78088316343 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T17:13:02 Date and time of file creation DATE-OBS 2005-09-27T11:31:45 Observation start date DATE-END 2005-09-27T11:56:56 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5985 Observation id SEQ NUM 290477 Sequence number RA NOM 332.16725187086 Nominal RA DEC NOM 45.788648144365 Nominal Dec ROLL NOM 221.78088316343 Nominal Roll

Summary Page Created:Sat November 24, 2007 12:14 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290477

Instrument: HRC Obs ID: 5985 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170039 45.742329 2194.416748 51.038006 42.995735 332.540214 45.985885 96.495018 25.563324 3.774745 331.801874 45.626650 66.906250 17.809385 3.756797 332.342677 45.538165 68.625000 18.564407 3.696590 332.369202 46.033544 73.208336 20.681112 3.539864 332.528662 45.778064 52.468964 15.128572 3.468204 332.491092 46.026249 85.106316 24.949150 3.411191 332.527838 45.698735 42.188049 12.820494 3.290673 332.423771 45.544288 78.089287 23.784605 3.283186 331.834487 45.994466 67.290176 20.521223 3.279053