Summary Page Created:Sat November 24, 2007 12:15 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290478

Instrument: HRC Obs ID: 5986 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05986N003 full img2.fits hrcf05986N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 12:15 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290478

Instrument: HRC Obs ID: 5986 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T17:04:53 Date and time of file creation DATE-OBS 2005-09-27T11:56:56 Observation start date DATE-END 2005-09-27T12:22:06 Observation end date RA PNT 332.09669131308 Pointing RA DEC PNT 45.744101996363 Pointing Dec ROLL PNT 221.90492661192 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T17:14:08 Date and time of file creation DATE-OBS 2005-09-27T11:56:56 Observation start date DATE-END 2005-09-27T12:22:06 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5986 Observation id SEQ NUM 290478 Sequence number RA NOM 332.09669131308 Nominal RA DEC NOM 45.744101996363 Nominal Dec ROLL NOM 221.90492661192 Nominal Roll

Summary Page Created:Sat November 24, 2007 12:15 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290478

Instrument: HRC Obs ID: 5986 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170057 45.742333 1546.416626 41.521786 37.243504 332.261986 45.492466 72.636360 16.960857 4.282588 332.262288 45.492253 64.218185 17.326345 3.706389 332.398380 45.683915 45.325581 12.628913 3.589033 332.435618 45.979163 99.642952 27.975431 3.561802 332.459396 45.771605 54.482758 15.344166 3.550715 332.397075 45.492620 83.717606 24.535078 3.412160 332.337344 45.987635 71.899109 21.708057 3.312093 331.902465 45.672436 28.975000 8.761847 3.306951 331.765941 45.513348 63.441860 19.218185 3.301137