Summary Page Created:Sat November 24, 2007 12:58 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290480

Instrument: HRC Obs ID: 5988 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05988N003 full img2.fits hrcf05988N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 12:58 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290480

Instrument: HRC Obs ID: 5988 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T17:49:07 Date and time of file creation DATE-OBS 2005-09-27T12:47:16 Observation start date DATE-END 2005-09-27T13:12:26 Observation end date RA PNT 332.22841954042 Pointing RA DEC PNT 45.691757798077 Pointing Dec ROLL PNT 221.82803130433 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T17:57:21 Date and time of file creation DATE-OBS 2005-09-27T12:47:16 Observation start date DATE-END 2005-09-27T13:12:26 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5988 Observation id SEQ NUM 290480 Sequence number RA NOM 332.22841954042 Nominal RA DEC NOM 45.691757798077 Nominal Dec ROLL NOM 221.82803130433 Nominal Roll

Summary Page Created:Sat November 24, 2007 12:58 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290480

Instrument: HRC Obs ID: 5988 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169939 45.742368 1251.822510 37.589870 33.302120 332.568641 45.486939 101.558136 24.385599 4.164677 332.599926 45.897373 111.869019 27.432871 4.077919 332.590515 45.786041 71.806992 18.852215 3.808942 332.521138 45.435459 82.999336 22.500080 3.688846 332.310398 45.446857 57.083332 15.834350 3.605032 332.563963 45.455566 96.880318 27.104658 3.574305 331.891179 45.894267 65.435219 18.436823 3.549159 331.877133 45.695759 52.500000 14.905872 3.522102 331.870001 45.562808 68.541664 20.109459 3.408429