Summary Page Created:Sat November 24, 2007 12:58 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290481

Instrument: HRC Obs ID: 5989 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05989N003 full img2.fits hrcf05989N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 12:58 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290481

Instrument: HRC Obs ID: 5989 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T17:48:53 Date and time of file creation DATE-OBS 2005-09-27T13:12:26 Observation start date DATE-END 2005-09-27T13:38:26 Observation end date RA PNT 332.26010762078 Pointing RA DEC PNT 45.666429828028 Pointing Dec ROLL PNT 221.82711532831 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T17:57:25 Date and time of file creation DATE-OBS 2005-09-27T13:12:26 Observation start date DATE-END 2005-09-27T13:38:26 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5989 Observation id SEQ NUM 290481 Sequence number RA NOM 332.26010762078 Nominal RA DEC NOM 45.666429828028 Nominal Dec ROLL NOM 221.82711532831 Nominal Roll

Summary Page Created:Sat November 24, 2007 12:58 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290481

Instrument: HRC Obs ID: 5989 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169896 45.742418 1401.724976 42.002819 33.372166 332.108485 45.928094 65.791664 16.630175 3.956162 332.478265 45.834054 52.242687 15.194623 3.438235 332.518582 45.910572 72.760712 21.491833 3.385505 332.260375 45.470214 38.708332 11.724130 3.301595 332.630468 45.871484 85.993355 26.489948 3.246264 331.992729 45.437778 60.291668 18.818781 3.203803 332.540786 45.414066 73.475082 23.158119 3.172757 332.607555 45.552214 51.189884 16.215715 3.156807 332.573143 45.904494 77.724251 25.030745 3.105151