Summary Page Created:Sat November 24, 2007 12:57 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290489

Instrument: HRC Obs ID: 5997 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05997N003 full img2.fits hrcf05997N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 12:57 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290489

Instrument: HRC Obs ID: 5997 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T17:48:57 Date and time of file creation DATE-OBS 2005-10-02T19:46:35 Observation start date DATE-END 2005-10-02T20:12:35 Observation end date RA PNT 332.50298873051 Pointing RA DEC PNT 45.753670857593 Pointing Dec ROLL PNT 228.03064373387 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T17:56:17 Date and time of file creation DATE-OBS 2005-10-02T19:46:35 Observation start date DATE-END 2005-10-02T20:12:35 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5997 Observation id SEQ NUM 290489 Sequence number RA NOM 332.50298873051 Nominal RA DEC NOM 45.753670857593 Nominal Dec ROLL NOM 228.03064373387 Nominal Roll

Summary Page Created:Sat November 24, 2007 12:57 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290489

Instrument: HRC Obs ID: 5997 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169984 45.742192 3318.215576 64.117798 51.751865 332.171881 45.742222 2045.245361 63.026390 32.450619 332.663116 46.011309 59.166668 15.757431 3.754842 332.765421 46.017403 57.039867 16.719131 3.411653 332.190407 45.843464 38.568626 12.112404 3.184226 332.174009 45.528562 53.734219 16.904545 3.178685 332.754523 45.530288 50.791668 16.133539 3.148204 332.380492 46.001655 38.048386 12.388463 3.071276 332.682676 45.570976 33.683510 10.999406 3.062303