Summary Page Created:Thu March 23, 2006 10:15 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290492

Instrument: HRC Obs ID: 6000 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06000N002 full img2.fits hrcf06000N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 10:15 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290492

Instrument: HRC Obs ID: 6000 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T14:40:46 Date and time of file creation DATE-OBS 2005-09-01T20:58:49 Observation start date DATE-END 2005-09-01T22:03:18 Observation end date RA PNT 332.16352466835 Pointing RA DEC PNT 45.741600875119 Pointing Dec ROLL PNT 190.85034110615 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:13:53 Date and time of file creation DATE-OBS 2005-09-01T20:58:49 Observation start date DATE-END 2005-09-01T22:03:18 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6000 Observation id SEQ NUM 290492 Sequence number RA NOM 332.16352466835 Nominal RA DEC NOM 45.741600875119 Nominal Dec ROLL NOM 190.85034110615 Nominal Roll

Summary Page Created:Thu March 23, 2006 10:15 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290492

Instrument: HRC Obs ID: 6000 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170061 45.742399 12003.875000 116.257149 103.252785 332.578112 45.842095 417.364288 45.754314 9.121857 332.595741 45.779652 429.182129 59.299980 7.237475 332.586521 45.817934 382.054474 56.975433 6.705600 332.604513 45.754497 299.665192 45.445843 6.593896 332.550743 45.839184 304.125000 49.292957 6.169745 331.812596 45.714918 213.208328 39.242725 5.433066 332.574604 45.742592 183.666672 39.218853 4.683122 331.825196 45.671558 154.791672 36.637680 4.224931 331.819076 45.693110 173.708328 41.681885 4.167478