Summary Page Created:Thu March 23, 2006 10:09 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290493

Instrument: HRC Obs ID: 6001 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06001N002 full img2.fits hrcf06001N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 10:09 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290493

Instrument: HRC Obs ID: 6001 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T14:40:25 Date and time of file creation DATE-OBS 2005-09-01T22:03:18 Observation start date DATE-END 2005-09-01T22:28:28 Observation end date RA PNT 332.21065682736 Pointing RA DEC PNT 45.748873516462 Pointing Dec ROLL PNT 190.84697397732 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:07:25 Date and time of file creation DATE-OBS 2005-09-01T22:03:18 Observation start date DATE-END 2005-09-01T22:28:28 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6001 Observation id SEQ NUM 290493 Sequence number RA NOM 332.21065682736 Nominal RA DEC NOM 45.748873516462 Nominal Dec ROLL NOM 190.84697397732 Nominal Roll

Summary Page Created:Thu March 23, 2006 10:09 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290493

Instrument: HRC Obs ID: 6001 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170119 45.742411 4637.227051 72.977493 63.543251 332.626018 45.850328 118.812500 24.256460 4.898180 332.651297 45.756439 105.009819 22.684473 4.629150 332.649961 45.780089 102.919640 25.552698 4.027740 332.633691 45.831464 105.583931 26.540562 3.978210 331.865835 45.700073 79.375000 20.618759 3.849650 332.044249 45.725339 28.041380 7.765824 3.610870 332.522511 45.834497 61.784313 18.500088 3.339677 332.635087 45.819509 95.466072 28.829716 3.311377 332.545098 45.839957 65.625000 19.916819 3.294954