Summary Page Created:Thu March 23, 2006 10:10 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290495

Instrument: HRC Obs ID: 6003 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06003N002 full img2.fits hrcf06003N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 10:10 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290495

Instrument: HRC Obs ID: 6003 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T14:43:22 Date and time of file creation DATE-OBS 2005-09-01T22:53:38 Observation start date DATE-END 2005-09-01T23:18:48 Observation end date RA PNT 332.11614984506 Pointing RA DEC PNT 45.735992991443 Pointing Dec ROLL PNT 191.00128651984 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:09:13 Date and time of file creation DATE-OBS 2005-09-01T22:53:38 Observation start date DATE-END 2005-09-01T23:18:48 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6003 Observation id SEQ NUM 290495 Sequence number RA NOM 332.11614984506 Nominal RA DEC NOM 45.735992991443 Nominal Dec ROLL NOM 191.00128651984 Nominal Roll

Summary Page Created:Thu March 23, 2006 10:10 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290495

Instrument: HRC Obs ID: 6003 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170061 45.742386 4933.856934 73.728806 66.918991 332.538728 45.818605 152.999100 28.009188 5.462461 332.556190 45.761446 140.583923 27.224503 5.163875 332.539999 45.806146 154.351791 30.937727 4.989112 332.531380 45.836989 126.532143 25.483133 4.965329 332.556990 45.748543 125.781250 25.823784 4.870752 332.548688 45.780804 131.960709 31.272305 4.219731 331.765514 45.713723 84.625000 20.420341 4.144152 331.859286 45.693601 55.681820 15.688527 3.549206 332.487492 45.834103 76.847549 21.667360 3.546697