Summary Page Created:Thu March 23, 2006 10:13 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290496

Instrument: HRC Obs ID: 6004 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06004N002 full img2.fits hrcf06004N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 10:13 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290496

Instrument: HRC Obs ID: 6004 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T14:46:56 Date and time of file creation DATE-OBS 2005-09-01T23:18:48 Observation start date DATE-END 2005-09-01T23:43:58 Observation end date RA PNT 332.17281679844 Pointing RA DEC PNT 45.709457529181 Pointing Dec ROLL PNT 190.95616871619 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:12:20 Date and time of file creation DATE-OBS 2005-09-01T23:18:48 Observation start date DATE-END 2005-09-01T23:43:58 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6004 Observation id SEQ NUM 290496 Sequence number RA NOM 332.17281679844 Nominal RA DEC NOM 45.709457529181 Nominal Dec ROLL NOM 190.95616871619 Nominal Roll

Summary Page Created:Thu March 23, 2006 10:13 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290496

Instrument: HRC Obs ID: 6004 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169944 45.742376 4745.647949 72.050377 65.865692 332.578914 45.810633 118.646431 23.999475 4.943709 332.595155 45.791767 115.642860 25.417395 4.549753 332.605236 45.715975 101.725891 25.248159 4.029042 332.604560 45.766340 99.919640 25.490763 3.919837 332.619469 45.722893 86.850502 22.526999 3.855396 332.592823 45.711079 79.291664 20.727356 3.825460 332.605737 45.754038 101.943748 26.960861 3.781176 331.816737 45.708242 49.625000 14.558221 3.408727 331.823476 45.682864 58.333332 17.150373 3.401286