Summary Page Created:Thu March 23, 2006 10:20 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290498

Instrument: HRC Obs ID: 6006 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06006N002 full img2.fits hrcf06006N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 10:20 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290498

Instrument: HRC Obs ID: 6006 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T14:53:55 Date and time of file creation DATE-OBS 2005-09-02T00:09:08 Observation start date DATE-END 2005-09-02T00:34:18 Observation end date RA PNT 332.20173287206 Pointing RA DEC PNT 45.78073089837 Pointing Dec ROLL PNT 190.95015485716 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:18:56 Date and time of file creation DATE-OBS 2005-09-02T00:09:08 Observation start date DATE-END 2005-09-02T00:34:18 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6006 Observation id SEQ NUM 290498 Sequence number RA NOM 332.20173287206 Nominal RA DEC NOM 45.78073089837 Nominal Dec ROLL NOM 190.95015485716 Nominal Roll

Summary Page Created:Thu March 23, 2006 10:20 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290498

Instrument: HRC Obs ID: 6006 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170278 45.742438 4314.000000 73.614868 58.602295 332.617477 45.882189 147.317856 22.543022 6.534965 332.634890 45.832188 137.279465 26.747726 5.132379 331.845571 45.775429 63.375000 15.527942 4.081352 332.643479 45.805880 98.366074 24.647543 3.990908 332.626369 45.857209 103.279465 26.070841 3.961493 332.624915 45.869849 83.033928 23.808905 3.487516 332.643353 45.788089 72.705360 21.394733 3.398283 331.933631 45.693449 51.020535 15.258302 3.343789 331.896441 45.683063 51.490196 16.232243 3.172094