Summary Page Created:Thu March 23, 2006 10:17 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290499

Instrument: HRC Obs ID: 6007 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06007N002 full img2.fits hrcf06007N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 10:17 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290499

Instrument: HRC Obs ID: 6007 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T14:53:14 Date and time of file creation DATE-OBS 2005-09-02T00:34:18 Observation start date DATE-END 2005-09-02T00:59:28 Observation end date RA PNT 332.1073788887 Pointing RA DEC PNT 45.767779234064 Pointing Dec ROLL PNT 191.08496412672 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:16:17 Date and time of file creation DATE-OBS 2005-09-02T00:34:18 Observation start date DATE-END 2005-09-02T00:59:28 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6007 Observation id SEQ NUM 290499 Sequence number RA NOM 332.1073788887 Nominal RA DEC NOM 45.767779234064 Nominal Dec ROLL NOM 191.08496412672 Nominal Roll

Summary Page Created:Thu March 23, 2006 10:17 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290499

Instrument: HRC Obs ID: 6007 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170174 45.742445 5070.166504 74.081528 68.440361 332.521775 45.868563 156.497314 28.714315 5.450150 332.548753 45.781046 134.109818 27.799135 4.824244 332.548992 45.793445 149.573212 31.116335 4.806903 332.539445 45.818584 167.112503 36.258488 4.608921 332.529947 45.850688 142.289291 32.939178 4.319758 332.546516 45.805340 136.265182 31.694315 4.299357 331.762593 45.723673 109.500000 25.848850 4.236165 331.768225 45.702167 100.916664 24.130772 4.182074 332.000230 45.697402 26.692499 7.302180 3.655416