Summary Page Created:Thu March 23, 2006 10:59 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290500

Instrument: HRC Obs ID: 6008 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06008N002 full img2.fits hrcf06008N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 10:59 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290500

Instrument: HRC Obs ID: 6008 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T14:55:42 Date and time of file creation DATE-OBS 2005-09-02T00:59:28 Observation start date DATE-END 2005-09-02T01:24:38 Observation end date RA PNT 332.12540783624 Pointing RA DEC PNT 45.7020223813 Pointing Dec ROLL PNT 191.09131311585 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:58:10 Date and time of file creation DATE-OBS 2005-09-02T00:59:28 Observation start date DATE-END 2005-09-02T01:24:38 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6008 Observation id SEQ NUM 290500 Sequence number RA NOM 332.12540783624 Nominal RA DEC NOM 45.7020223813 Nominal Dec ROLL NOM 191.09131311585 Nominal Roll

Summary Page Created:Thu March 23, 2006 10:59 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290500

Instrument: HRC Obs ID: 6008 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169884 45.742328 5048.208496 73.550102 68.636322 332.566063 45.709930 122.068748 21.516659 5.673221 332.540261 45.803520 119.009819 23.008896 5.172339 332.548177 45.784536 126.781250 25.844151 4.905607 332.556790 45.759390 93.168747 25.708519 3.624042 331.775354 45.679841 63.708332 18.295525 3.482181 332.565868 45.727345 83.504463 24.535219 3.403453 331.805305 45.601711 47.416668 14.877858 3.187063 332.459569 45.697515 57.705883 18.269876 3.158526 332.356567 45.760237 36.255173 11.927373 3.039661