Summary Page Created:Thu March 23, 2006 11:00 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290501

Instrument: HRC Obs ID: 6009 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06009N002 full img2.fits hrcf06009N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 11:00 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290501

Instrument: HRC Obs ID: 6009 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T14:57:35 Date and time of file creation DATE-OBS 2005-09-02T01:24:38 Observation start date DATE-END 2005-09-02T01:49:48 Observation end date RA PNT 332.26699692083 Pointing RA DEC PNT 45.720912253945 Pointing Dec ROLL PNT 190.93734809198 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:58:43 Date and time of file creation DATE-OBS 2005-09-02T01:24:38 Observation start date DATE-END 2005-09-02T01:49:48 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6009 Observation id SEQ NUM 290501 Sequence number RA NOM 332.26699692083 Nominal RA DEC NOM 45.720912253945 Nominal Dec ROLL NOM 190.93734809198 Nominal Roll

Summary Page Created:Thu March 23, 2006 11:00 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290501

Instrument: HRC Obs ID: 6009 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169899 45.742374 4842.571289 74.004982 65.435745 332.170154 45.742313 2564.760010 72.233109 35.506710 332.673473 45.822102 124.172325 24.909576 4.984923 332.699258 45.771713 145.213394 30.619471 4.742518 332.668294 45.721231 102.791664 23.165949 4.437188 331.915734 45.698698 84.125000 21.069593 3.992721 332.690671 45.791086 123.905357 31.072971 3.987561 332.708756 45.727997 92.784821 23.639629 3.924969 331.927615 45.675356 86.176468 22.175196 3.886165 332.689847 45.803191 106.469643 27.749825 3.836768