Summary Page Created:Thu March 23, 2006 11:03 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290502

Instrument: HRC Obs ID: 6010 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06010N002 full img2.fits hrcf06010N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 11:03 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290502

Instrument: HRC Obs ID: 6010 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T14:58:18 Date and time of file creation DATE-OBS 2005-09-02T01:49:48 Observation start date DATE-END 2005-09-02T02:14:58 Observation end date RA PNT 332.25684595818 Pointing RA DEC PNT 45.753287463728 Pointing Dec ROLL PNT 190.96384885512 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T16:02:10 Date and time of file creation DATE-OBS 2005-09-02T01:49:48 Observation start date DATE-END 2005-09-02T02:14:58 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6010 Observation id SEQ NUM 290502 Sequence number RA NOM 332.25684595818 Nominal RA DEC NOM 45.753287463728 Nominal Dec ROLL NOM 190.96384885512 Nominal Roll

Summary Page Created:Thu March 23, 2006 11:03 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290502

Instrument: HRC Obs ID: 6010 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170001 45.742359 4371.477051 70.822456 61.724449 332.698029 45.765876 144.642853 26.010839 5.560868 332.681411 45.817004 146.988388 31.553886 4.658329 332.671655 45.854364 103.393753 24.795996 4.169776 332.689285 45.797263 113.158035 30.000383 3.771886 332.627345 45.847162 91.848953 24.442190 3.757804 332.680673 45.829435 110.074997 29.845621 3.688146 331.917691 45.687645 71.625000 20.077351 3.567453 331.911733 45.708951 73.916664 21.082567 3.506056 332.509706 45.727687 33.784092 11.196319 3.017428