Summary Page Created:Thu March 23, 2006 11:04 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290503

Instrument: HRC Obs ID: 6011 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06011N002 full img2.fits hrcf06011N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 11:04 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290503

Instrument: HRC Obs ID: 6011 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:01:36 Date and time of file creation DATE-OBS 2005-09-02T02:14:58 Observation start date DATE-END 2005-09-02T02:40:08 Observation end date RA PNT 332.30466698003 Pointing RA DEC PNT 45.759520464918 Pointing Dec ROLL PNT 190.92497109095 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T16:02:42 Date and time of file creation DATE-OBS 2005-09-02T02:14:58 Observation start date DATE-END 2005-09-02T02:40:08 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6011 Observation id SEQ NUM 290503 Sequence number RA NOM 332.30466698003 Nominal RA DEC NOM 45.759520464918 Nominal Dec ROLL NOM 190.92497109095 Nominal Roll

Summary Page Created:Thu March 23, 2006 11:04 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290503

Instrument: HRC Obs ID: 6011 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169999 45.742417 5792.113770 81.433144 71.127228 332.719612 45.860689 172.535721 24.992601 6.903471 332.728390 45.835550 169.324112 31.157009 5.434543 332.745951 45.766639 128.480362 23.960941 5.362074 332.737486 45.803698 175.538391 33.728634 5.204432 331.947954 45.757859 70.916664 16.586115 4.275664 332.734907 45.823219 121.102676 30.071732 4.027127 332.691386 45.856911 104.375000 26.899008 3.880255 332.751391 45.767248 79.684387 21.029661 3.789143 332.616674 45.848292 61.647060 19.668304 3.134335