Summary Page Created:Thu March 23, 2006 11:07 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290504

Instrument: HRC Obs ID: 6012 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06012N002 full img2.fits hrcf06012N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 11:07 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290504

Instrument: HRC Obs ID: 6012 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:02:08 Date and time of file creation DATE-OBS 2005-09-02T02:40:08 Observation start date DATE-END 2005-09-02T03:05:18 Observation end date RA PNT 332.24863527201 Pointing RA DEC PNT 45.785872986029 Pointing Dec ROLL PNT 191.00844039211 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T16:06:04 Date and time of file creation DATE-OBS 2005-09-02T02:40:08 Observation start date DATE-END 2005-09-02T03:05:18 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6012 Observation id SEQ NUM 290504 Sequence number RA NOM 332.24863527201 Nominal RA DEC NOM 45.785872986029 Nominal Dec ROLL NOM 191.00844039211 Nominal Roll

Summary Page Created:Thu March 23, 2006 11:07 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290504

Instrument: HRC Obs ID: 6012 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170131 45.742430 3709.762451 67.574501 54.898849 332.170103 45.742388 2921.714355 69.705856 41.914906 332.663877 45.886361 183.801788 29.584513 6.212770 332.681316 45.836474 216.804459 37.630329 5.761429 332.672233 45.868579 146.562500 34.372837 4.263905 332.689626 45.817406 134.597321 32.044712 4.200297 332.689948 45.793738 100.421425 24.773745 4.053543 332.626580 45.782234 80.309021 20.719057 3.876094 332.530123 45.773731 75.875000 19.846205 3.823149 331.902598 45.764651 92.019608 24.334146 3.781501