Summary Page Created:Thu March 23, 2006 11:11 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290505

Instrument: HRC Obs ID: 6013 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06013N002 full img2.fits hrcf06013N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 11:11 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290505

Instrument: HRC Obs ID: 6013 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:05:39 Date and time of file creation DATE-OBS 2005-09-02T03:05:18 Observation start date DATE-END 2005-09-02T03:30:28 Observation end date RA PNT 332.06025725549 Pointing RA DEC PNT 45.760087706333 Pointing Dec ROLL PNT 191.25853945307 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T16:09:40 Date and time of file creation DATE-OBS 2005-09-02T03:05:18 Observation start date DATE-END 2005-09-02T03:30:28 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6013 Observation id SEQ NUM 290505 Sequence number RA NOM 332.06025725549 Nominal RA DEC NOM 45.760087706333 Nominal Dec ROLL NOM 191.25853945307 Nominal Roll

Summary Page Created:Thu March 23, 2006 11:11 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290505

Instrument: HRC Obs ID: 6013 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170214 45.742430 4018.291748 65.196800 61.633266 332.467077 45.861455 123.251785 26.432442 4.662899 332.493544 45.767637 101.033928 24.205271 4.174047 332.394932 45.851631 78.291664 20.701599 3.781914 332.492200 45.817507 101.995537 28.349880 3.597741 331.716049 45.715611 75.708336 21.396387 3.538370 332.406534 45.752387 56.647060 16.652876 3.401638 332.476197 45.830020 98.763390 31.646578 3.120824 332.455304 45.858355 80.833336 25.961576 3.113576