Summary Page Created:Thu March 23, 2006 11:23 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290506

Instrument: HRC Obs ID: 6014 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06014N002 full img2.fits hrcf06014N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 11:23 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290506

Instrument: HRC Obs ID: 6014 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:15:42 Date and time of file creation DATE-OBS 2005-09-02T03:30:28 Observation start date DATE-END 2005-09-02T03:55:38 Observation end date RA PNT 332.07069193875 Pointing RA DEC PNT 45.727528648948 Pointing Dec ROLL PNT 191.27035338308 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T16:21:24 Date and time of file creation DATE-OBS 2005-09-02T03:30:28 Observation start date DATE-END 2005-09-02T03:55:38 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6014 Observation id SEQ NUM 290506 Sequence number RA NOM 332.07069193875 Nominal RA DEC NOM 45.727528648948 Nominal Dec ROLL NOM 191.27035338308 Nominal Roll

Summary Page Created:Thu March 23, 2006 11:23 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290506

Instrument: HRC Obs ID: 6014 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170031 45.742347 3727.142822 65.866730 56.586121 332.169859 45.742278 1238.977539 65.774567 18.836727 332.504192 45.771887 162.750000 27.866648 5.840315 332.485682 45.829357 108.982140 22.732090 4.794198 332.466058 45.829889 82.250000 20.858271 3.943280 332.357777 45.813830 58.644520 15.146249 3.871884 332.512077 45.735453 77.345535 20.879726 3.704337 332.494711 45.734371 82.310715 24.217133 3.398863 332.364803 45.813727 49.197472 15.380123 3.198770 331.909883 45.654090 26.541666 8.571662 3.096443