Summary Page Created:Thu March 23, 2006 11:23 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290507

Instrument: HRC Obs ID: 6015 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06015N002 full img2.fits hrcf06015N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 11:23 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290507

Instrument: HRC Obs ID: 6015 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:20:14 Date and time of file creation DATE-OBS 2005-09-02T03:55:38 Observation start date DATE-END 2005-09-02T04:20:48 Observation end date RA PNT 332.02277999334 Pointing RA DEC PNT 45.720840336591 Pointing Dec ROLL PNT 191.34796535338 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T16:21:50 Date and time of file creation DATE-OBS 2005-09-02T03:55:38 Observation start date DATE-END 2005-09-02T04:20:48 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6015 Observation id SEQ NUM 290507 Sequence number RA NOM 332.02277999334 Nominal RA DEC NOM 45.720840336591 Nominal Dec ROLL NOM 191.34796535338 Nominal Roll

Summary Page Created:Thu March 23, 2006 11:23 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290507

Instrument: HRC Obs ID: 6015 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170055 45.742354 4387.700195 69.504852 63.127968 332.454517 45.777880 165.386612 28.735823 5.755415 332.436855 45.822290 145.504471 25.832623 5.632586 332.463194 45.733403 109.840179 24.102674 4.557178 331.678606 45.676808 88.708336 20.414787 4.345298 332.433937 45.726233 96.500000 23.364214 4.130248 332.363356 45.713097 63.960785 17.368315 3.682613 332.419205 45.823498 83.750000 22.775917 3.677130 332.386504 45.819242 75.965034 21.337494 3.560167 331.701352 45.690382 70.394943 20.408714 3.449259