Summary Page Created:Thu March 23, 2006 11:23 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290508

Instrument: HRC Obs ID: 6016 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06016N002 full img2.fits hrcf06016N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 11:23 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290508

Instrument: HRC Obs ID: 6016 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:16:35 Date and time of file creation DATE-OBS 2005-09-02T04:20:48 Observation start date DATE-END 2005-09-02T04:45:58 Observation end date RA PNT 332.07936050195 Pointing RA DEC PNT 45.694828218977 Pointing Dec ROLL PNT 191.30277532696 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T16:21:29 Date and time of file creation DATE-OBS 2005-09-02T04:20:48 Observation start date DATE-END 2005-09-02T04:45:58 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6016 Observation id SEQ NUM 290508 Sequence number RA NOM 332.07936050195 Nominal RA DEC NOM 45.694828218977 Nominal Dec ROLL NOM 191.30277532696 Nominal Roll

Summary Page Created:Thu March 23, 2006 11:23 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290508

Instrument: HRC Obs ID: 6016 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169904 45.742333 3360.416748 59.791492 56.202255 332.493854 45.796357 104.566963 21.939548 4.766140 331.729820 45.668505 60.208332 15.718785 3.830343 331.728403 45.676852 61.625000 16.774654 3.673697 332.443106 45.792693 65.787415 18.739660 3.510598 332.498127 45.700397 70.500000 20.218262 3.486947 331.874036 45.631255 29.872499 8.980951 3.326206 331.734875 45.650468 54.666668 16.477680 3.317619 332.511670 45.745339 74.674110 23.053988 3.239097 332.512368 45.726507 74.978569 23.542696 3.184791