Summary Page Created:Thu March 23, 2006 11:27 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290509

Instrument: HRC Obs ID: 6017 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06017N002 full img2.fits hrcf06017N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 11:27 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290509

Instrument: HRC Obs ID: 6017 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:23:21 Date and time of file creation DATE-OBS 2005-09-02T04:45:58 Observation start date DATE-END 2005-09-02T05:11:08 Observation end date RA PNT 331.93946216654 Pointing RA DEC PNT 45.675203510206 Pointing Dec ROLL PNT 191.49423359883 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T16:25:29 Date and time of file creation DATE-OBS 2005-09-02T04:45:58 Observation start date DATE-END 2005-09-02T05:11:08 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6017 Observation id SEQ NUM 290509 Sequence number RA NOM 331.93946216654 Nominal RA DEC NOM 45.675203510206 Nominal Dec ROLL NOM 191.49423359883 Nominal Roll

Summary Page Created:Thu March 23, 2006 11:27 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290509

Instrument: HRC Obs ID: 6017 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170029 45.742437 2629.386230 56.259411 46.736824 332.353408 45.777008 133.867859 24.664333 5.427588 332.379271 45.683282 94.349106 19.489336 4.841063 331.620101 45.575052 69.958336 14.669429 4.768988 332.379397 45.706737 99.923218 24.011940 4.161397 332.350038 45.680991 86.916664 21.408546 4.059905 331.602648 45.605153 73.000000 18.125237 4.027534 332.370998 45.731984 103.417854 26.267246 3.937141 332.372222 45.719969 103.165176 27.282816 3.781324 332.369328 45.745158 78.366074 24.215084 3.236250