Summary Page Created:Thu March 23, 2006 12:25 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290512

Instrument: HRC Obs ID: 6020 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06020N002 full img2.fits hrcf06020N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 12:25 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290512

Instrument: HRC Obs ID: 6020 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T16:58:25 Date and time of file creation DATE-OBS 2005-09-02T06:01:28 Observation start date DATE-END 2005-09-02T06:40:12 Observation end date RA PNT 331.91969439633 Pointing RA DEC PNT 45.740959931169 Pointing Dec ROLL PNT 191.56652143799 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T17:24:23 Date and time of file creation DATE-OBS 2005-09-02T06:01:28 Observation start date DATE-END 2005-09-02T06:40:12 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6020 Observation id SEQ NUM 290512 Sequence number RA NOM 331.91969439633 Nominal RA DEC NOM 45.740959931169 Nominal Dec ROLL NOM 191.56652143799 Nominal Roll

Summary Page Created:Thu March 23, 2006 12:25 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290512

Instrument: HRC Obs ID: 6020 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170297 45.742558 3434.220703 65.061806 52.783974 332.342332 45.829567 91.037498 22.401276 4.063943 332.360807 45.759520 90.203575 22.654125 3.981772 332.352740 45.791658 88.037498 22.330105 3.942547 332.359436 45.778582 75.539284 21.176153 3.567187 331.573047 45.735757 55.176472 15.841711 3.482987 332.227132 45.778932 49.873753 14.572190 3.422530 331.591637 45.740434 44.287899 14.600016 3.033415 332.188532 45.790184 38.291668 12.698112 3.015540 331.617221 45.730099 43.720932 14.511694 3.012807