Summary Page Created:Wed February 22, 2006 16:38 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290514

Instrument: HRC Obs ID: 6022 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06022N002 full img2.fits hrcf06022N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 16:38 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290514

Instrument: HRC Obs ID: 6022 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T21:20:05 Date and time of file creation DATE-OBS 2005-02-10T11:49:06 Observation start date DATE-END 2005-02-10T12:14:16 Observation end date RA PNT 332.12922971737 Pointing RA DEC PNT 45.747666822041 Pointing Dec ROLL PNT 351.19716948108 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T21:37:00 Date and time of file creation DATE-OBS 2005-02-10T11:49:06 Observation start date DATE-END 2005-02-10T12:14:16 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6022 Observation id SEQ NUM 290514 Sequence number RA NOM 332.12922971737 Nominal RA DEC NOM 45.747666822041 Nominal Dec ROLL NOM 351.19716948108 Nominal Roll

Summary Page Created:Wed February 22, 2006 16:38 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290514

Instrument: HRC Obs ID: 6022 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169912 45.742346 5271.863770 77.354828 68.151711 331.694800 45.785346 112.013390 21.170147 5.291101 331.688184 45.748257 69.629463 17.298412 4.025194 331.705656 45.842758 73.155357 18.510006 3.952206 332.473001 45.690601 47.083332 13.526661 3.480780 331.703690 45.824253 73.009819 21.923080 3.330272 331.794852 45.838162 47.625000 14.482748 3.288395 331.734029 45.844256 57.875000 17.865643 3.239458 331.727652 45.742824 56.916668 17.771591 3.202677 331.829246 45.753876 37.107143 12.116617 3.062500