Summary Page Created:Wed February 22, 2006 16:40 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290515

Instrument: HRC Obs ID: 6023 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06023N002 full img2.fits hrcf06023N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 16:40 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290515

Instrument: HRC Obs ID: 6023 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T21:21:38 Date and time of file creation DATE-OBS 2005-02-10T12:14:16 Observation start date DATE-END 2005-02-10T12:39:26 Observation end date RA PNT 332.16998078933 Pointing RA DEC PNT 45.709344491302 Pointing Dec ROLL PNT 351.16851145333 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T21:39:17 Date and time of file creation DATE-OBS 2005-02-10T12:14:16 Observation start date DATE-END 2005-02-10T12:39:26 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6023 Observation id SEQ NUM 290515 Sequence number RA NOM 332.16998078933 Nominal RA DEC NOM 45.709344491302 Nominal Dec ROLL NOM 351.16851145333 Nominal Roll

Summary Page Created:Wed February 22, 2006 16:40 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290515

Instrument: HRC Obs ID: 6023 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169758 45.742323 4837.102051 75.559456 64.017166 331.728945 45.710205 95.795532 18.435678 5.196203 331.798937 45.803047 88.374825 17.556793 5.033654 331.745966 45.799577 100.625893 20.179327 4.986583 331.745163 45.709532 80.483925 21.203434 3.795797 332.485682 45.731250 45.559177 12.642898 3.603539 331.830045 45.770235 49.250000 15.257396 3.227943 331.731512 45.734233 59.598213 19.006832 3.135621 332.425101 45.635928 35.750000 11.475933 3.115215 331.736571 45.747422 64.566963 20.947315 3.082350