Summary Page Created:Wed February 22, 2006 16:44 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290516

Instrument: HRC Obs ID: 6024 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06024N002 full img2.fits hrcf06024N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 16:44 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290516

Instrument: HRC Obs ID: 6024 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T21:27:12 Date and time of file creation DATE-OBS 2005-02-10T12:39:26 Observation start date DATE-END 2005-02-10T13:04:37 Observation end date RA PNT 332.22328519723 Pointing RA DEC PNT 45.737016930511 Pointing Dec ROLL PNT 351.13080236163 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T21:42:49 Date and time of file creation DATE-OBS 2005-02-10T12:39:26 Observation start date DATE-END 2005-02-10T13:04:37 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6024 Observation id SEQ NUM 290516 Sequence number RA NOM 332.22328519723 Nominal RA DEC NOM 45.737016930511 Nominal Dec ROLL NOM 351.13080236163 Nominal Roll

Summary Page Created:Wed February 22, 2006 16:44 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290516

Instrument: HRC Obs ID: 6024 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169973 45.742337 5526.143066 76.821739 71.934624 331.782392 45.737953 90.684822 18.057171 5.022095 331.798531 45.826232 92.653572 20.019152 4.628246 331.784420 45.761942 77.155357 18.625603 4.142436 331.790047 45.781976 70.400894 20.800791 3.384530 331.865680 45.829686 47.305351 14.825717 3.190763 331.844360 45.829813 60.041668 19.175625 3.131145 331.828106 45.829895 60.541668 19.895403 3.042998