Summary Page Created:Wed February 22, 2006 16:58 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290517

Instrument: HRC Obs ID: 6025 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06025N002 full img2.fits hrcf06025N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 16:58 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290517

Instrument: HRC Obs ID: 6025 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T21:28:15 Date and time of file creation DATE-OBS 2005-02-10T13:04:37 Observation start date DATE-END 2005-02-10T13:29:46 Observation end date RA PNT 332.18430402101 Pointing RA DEC PNT 45.774860767182 Pointing Dec ROLL PNT 351.19694572921 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T21:56:29 Date and time of file creation DATE-OBS 2005-02-10T13:04:37 Observation start date DATE-END 2005-02-10T13:29:46 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6025 Observation id SEQ NUM 290517 Sequence number RA NOM 332.18430402101 Nominal RA DEC NOM 45.774860767182 Nominal Dec ROLL NOM 351.19694572921 Nominal Roll

Summary Page Created:Wed February 22, 2006 16:58 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290517

Instrument: HRC Obs ID: 6025 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170076 45.742317 4857.386230 73.424950 66.154442 331.767431 45.869440 103.570534 20.154779 5.138758 331.743253 45.780957 83.041069 20.479004 4.054937 331.797062 45.862150 78.958336 21.155716 3.732246 331.750148 45.806351 67.317856 20.572050 3.272297 332.423086 45.795571 30.137932 9.820084 3.069010