Summary Page Created:Wed February 22, 2006 17:04 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290518

Instrument: HRC Obs ID: 6026 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06026N002 full img2.fits hrcf06026N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 17:04 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290518

Instrument: HRC Obs ID: 6026 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T21:31:00 Date and time of file creation DATE-OBS 2005-02-10T13:29:46 Observation start date DATE-END 2005-02-10T13:54:56 Observation end date RA PNT 332.13690879949 Pointing RA DEC PNT 45.779712536193 Pointing Dec ROLL PNT 351.26927028109 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T22:02:28 Date and time of file creation DATE-OBS 2005-02-10T13:29:46 Observation start date DATE-END 2005-02-10T13:54:56 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6026 Observation id SEQ NUM 290518 Sequence number RA NOM 332.13690879949 Nominal RA DEC NOM 45.779712536193 Nominal Dec ROLL NOM 351.26927028109 Nominal Roll

Summary Page Created:Wed February 22, 2006 17:04 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290518

Instrument: HRC Obs ID: 6026 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170063 45.742312 5038.143066 76.569305 65.798470 331.757433 45.871894 93.416664 19.563766 4.774984 331.703420 45.817642 88.570534 19.753704 4.483743 331.695995 45.785812 75.459824 19.180944 3.934103 331.712877 45.874443 64.961609 17.867514 3.635738 331.711912 45.862241 75.622322 21.323236 3.546475 331.711858 45.850733 72.843750 21.636606 3.366690 331.711570 45.780100 70.594643 21.148785 3.338000 332.474227 45.692470 36.625000 11.832355 3.095327 331.795995 45.866319 48.000000 15.669473 3.063281