Summary Page Created:Wed February 22, 2006 17:08 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290519

Instrument: HRC Obs ID: 6027 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06027N002 full img2.fits hrcf06027N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 17:08 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290519

Instrument: HRC Obs ID: 6027 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T21:33:19 Date and time of file creation DATE-OBS 2005-02-10T13:54:56 Observation start date DATE-END 2005-02-10T14:20:06 Observation end date RA PNT 332.12156411094 Pointing RA DEC PNT 45.713676722252 Pointing Dec ROLL PNT 351.2996435614 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T22:06:30 Date and time of file creation DATE-OBS 2005-02-10T13:54:56 Observation start date DATE-END 2005-02-10T14:20:06 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6027 Observation id SEQ NUM 290519 Sequence number RA NOM 332.12156411094 Nominal RA DEC NOM 45.713676722252 Nominal Dec ROLL NOM 351.2996435614 Nominal Roll

Summary Page Created:Wed February 22, 2006 17:08 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290519

Instrument: HRC Obs ID: 6027 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169731 45.742332 5075.428711 78.858742 64.361015 331.679882 45.714172 107.850891 18.892788 5.708575 331.688456 45.751966 101.542854 20.049639 5.064573 331.697477 45.803496 98.764282 20.384750 4.845008 331.687581 45.738301 93.456253 21.478666 4.351120 331.743937 45.704640 60.050220 16.322969 3.678878 331.849397 45.799202 31.553572 9.813931 3.215182 331.697042 45.790443 67.650002 21.171734 3.195298 331.689217 45.764340 61.847321 19.552328 3.163169 332.457206 45.631077 39.333332 12.648638 3.109689