Summary Page Created:Wed February 22, 2006 17:20 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290520

Instrument: HRC Obs ID: 6028 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06028N002 full img2.fits hrcf06028N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 17:20 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290520

Instrument: HRC Obs ID: 6028 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T21:41:31 Date and time of file creation DATE-OBS 2005-02-10T14:20:06 Observation start date DATE-END 2005-02-10T14:45:16 Observation end date RA PNT 332.21701468002 Pointing RA DEC PNT 45.703037127458 Pointing Dec ROLL PNT 351.21277762926 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T22:18:54 Date and time of file creation DATE-OBS 2005-02-10T14:20:06 Observation start date DATE-END 2005-02-10T14:45:16 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6028 Observation id SEQ NUM 290520 Sequence number RA NOM 332.21701468002 Nominal RA DEC NOM 45.703037127458 Nominal Dec ROLL NOM 351.21277762926 Nominal Roll

Summary Page Created:Wed February 22, 2006 17:20 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290520

Instrument: HRC Obs ID: 6028 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169792 45.742328 5171.000000 75.185829 68.776260 331.794085 45.798164 82.684822 17.817631 4.640618 331.775949 45.704086 84.933929 18.401930 4.615490 331.882230 45.743675 56.666668 15.020093 3.772724 331.848569 45.693887 57.462070 15.235784 3.771520 331.883379 45.793544 45.666668 14.325867 3.187707 331.785366 45.766542 59.736607 19.281071 3.098200 332.568373 45.685211 43.625000 14.330422 3.044223 331.784291 45.734840 64.760712 21.292698 3.041452