Summary Page Created:Wed February 22, 2006 17:20 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290521

Instrument: HRC Obs ID: 6029 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06029N002 full img2.fits hrcf06029N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 17:20 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290521

Instrument: HRC Obs ID: 6029 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T21:35:07 Date and time of file creation DATE-OBS 2005-02-10T14:45:16 Observation start date DATE-END 2005-02-10T15:10:27 Observation end date RA PNT 332.23054936386 Pointing RA DEC PNT 45.768815624608 Pointing Dec ROLL PNT 351.22233261522 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T22:18:46 Date and time of file creation DATE-OBS 2005-02-10T14:45:16 Observation start date DATE-END 2005-02-10T15:10:27 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6029 Observation id SEQ NUM 290521 Sequence number RA NOM 332.23054936386 Nominal RA DEC NOM 45.768815624608 Nominal Dec ROLL NOM 351.22233261522 Nominal Roll

Summary Page Created:Wed February 22, 2006 17:20 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290521

Instrument: HRC Obs ID: 6029 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170096 45.742288 5138.791504 74.684700 68.806488 331.789180 45.769162 104.740181 18.582041 5.636635 331.795694 45.794005 84.539284 21.401171 3.950218 331.859184 45.861964 57.355244 16.643621 3.446080 331.805305 45.858395 69.234825 20.471390 3.382028 331.820041 45.763867 54.708332 16.408007 3.334246 331.883555 45.764190 52.254902 15.872062 3.292257 331.795946 45.806664 65.290176 20.469126 3.189691 331.872143 45.861341 47.351906 14.896666 3.178692