Summary Page Created:Wed February 22, 2006 17:35 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290522

Instrument: HRC Obs ID: 6030 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06030N002 full img2.fits hrcf06030N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 17:35 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290522

Instrument: HRC Obs ID: 6030 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T21:44:45 Date and time of file creation DATE-OBS 2005-02-10T15:10:27 Observation start date DATE-END 2005-02-10T15:35:37 Observation end date RA PNT 332.08922029889 Pointing RA DEC PNT 45.783811376429 Pointing Dec ROLL PNT 351.39978006915 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T22:33:31 Date and time of file creation DATE-OBS 2005-02-10T15:10:27 Observation start date DATE-END 2005-02-10T15:35:37 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6030 Observation id SEQ NUM 290522 Sequence number RA NOM 332.08922029889 Nominal RA DEC NOM 45.783811376429 Nominal Dec ROLL NOM 351.39978006915 Nominal Roll

Summary Page Created:Wed February 22, 2006 17:35 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290522

Instrument: HRC Obs ID: 6030 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170068 45.742322 4859.370117 73.729362 65.908203 332.170203 45.742131 1560.285767 77.459869 20.143150 331.647079 45.784195 94.099998 18.997787 4.953208 331.656766 45.840605 75.958038 20.140629 3.771384 331.664119 45.872729 69.404465 18.901686 3.671866 331.655773 45.828566 71.124107 20.318800 3.500409 331.663498 45.860284 71.262497 20.574291 3.463667 331.709591 45.875671 62.291668 18.875797 3.300081 331.654768 45.815936 67.262497 20.470263 3.285864 331.710660 45.774752 51.910557 15.858209 3.273419