Summary Page Created:Wed February 22, 2006 17:24 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290523

Instrument: HRC Obs ID: 6031 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06031N002 full img2.fits hrcf06031N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 17:24 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290523

Instrument: HRC Obs ID: 6031 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T21:43:05 Date and time of file creation DATE-OBS 2005-02-10T15:35:37 Observation start date DATE-END 2005-02-10T16:00:46 Observation end date RA PNT 332.08232808963 Pointing RA DEC PNT 45.750615010448 Pointing Dec ROLL PNT 351.4240353485 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T22:22:52 Date and time of file creation DATE-OBS 2005-02-10T15:35:37 Observation start date DATE-END 2005-02-10T16:00:46 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6031 Observation id SEQ NUM 290523 Sequence number RA NOM 332.08232808963 Nominal RA DEC NOM 45.750615010448 Nominal Dec ROLL NOM 351.4240353485 Nominal Roll

Summary Page Created:Wed February 22, 2006 17:24 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290523

Instrument: HRC Obs ID: 6031 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169956 45.742326 4796.715820 73.842216 64.958992 331.658495 45.845259 91.767860 18.261278 5.025270 331.641296 45.750873 88.961609 18.574963 4.789329 331.650282 45.808175 71.404465 18.958338 3.766388 331.678381 45.842763 71.708336 19.964949 3.591711 331.657266 45.782331 74.674110 23.053988 3.239097 331.731644 45.838535 49.599998 16.344589 3.034643 331.775809 45.833955 42.367020 13.971290 3.032435