Summary Page Created:Wed February 22, 2006 17:52 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290525

Instrument: HRC Obs ID: 6033 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06033N002 full img2.fits hrcf06033N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 17:52 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290525

Instrument: HRC Obs ID: 6033 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T22:34:55 Date and time of file creation DATE-OBS 2005-02-10T16:25:56 Observation start date DATE-END 2005-02-10T16:51:06 Observation end date RA PNT 332.07529824284 Pointing RA DEC PNT 45.71739623878 Pointing Dec ROLL PNT 351.46760160525 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T22:50:59 Date and time of file creation DATE-OBS 2005-02-10T16:25:56 Observation start date DATE-END 2005-02-10T16:51:06 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6033 Observation id SEQ NUM 290525 Sequence number RA NOM 332.07529824284 Nominal RA DEC NOM 45.71739623878 Nominal Dec ROLL NOM 351.46760160525 Nominal Roll

Summary Page Created:Wed February 22, 2006 17:52 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290525

Instrument: HRC Obs ID: 6033 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169873 45.742316 4465.428711 75.825470 58.890881 332.169880 45.742262 4180.597656 74.736931 55.937508 331.652176 45.812072 84.933929 18.401930 4.615490 331.634323 45.717768 80.878571 18.169096 4.451436 331.657145 45.712639 64.708336 18.324913 3.531167 331.695505 45.809056 66.291664 18.989250 3.491010 331.689685 45.708347 53.584679 15.458820 3.466285 331.642332 45.743298 72.650002 21.297159 3.411253 332.430193 45.717204 45.083332 13.444891 3.353194 332.427388 45.733697 47.625000 14.482748 3.288395