Summary Page Created:Wed February 22, 2006 17:54 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290526

Instrument: HRC Obs ID: 6034 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06034N002 full img2.fits hrcf06034N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 17:54 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290526

Instrument: HRC Obs ID: 6034 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T22:37:18 Date and time of file creation DATE-OBS 2005-02-10T16:51:06 Observation start date DATE-END 2005-02-10T17:16:16 Observation end date RA PNT 332.2631863289 Pointing RA DEC PNT 45.6973232567 Pointing Dec ROLL PNT 351.2763852467 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T22:52:42 Date and time of file creation DATE-OBS 2005-02-10T16:51:06 Observation start date DATE-END 2005-02-10T17:16:16 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6034 Observation id SEQ NUM 290526 Sequence number RA NOM 332.2631863289 Nominal RA DEC NOM 45.6973232567 Nominal Dec ROLL NOM 351.2763852467 Nominal Roll

Summary Page Created:Wed February 22, 2006 17:54 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290526

Instrument: HRC Obs ID: 6034 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169767 45.742327 5132.166504 73.774666 69.565430 331.828677 45.722787 83.428574 21.180433 3.938945 331.821536 45.697245 70.989288 18.105694 3.920826 331.832173 45.767522 72.570534 19.315689 3.757077 331.831480 45.754776 73.902679 19.983049 3.698268 331.885172 45.788610 67.333336 18.957968 3.551717 332.580187 45.614677 45.666668 14.614617 3.124725 331.838711 45.786664 61.068748 19.949465 3.061172