Summary Page Created:Wed February 22, 2006 18:30 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290529

Instrument: HRC Obs ID: 6037 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06037N002 full img2.fits hrcf06037N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 18:30 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290529

Instrument: HRC Obs ID: 6037 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T23:04:19 Date and time of file creation DATE-OBS 2005-02-10T18:06:37 Observation start date DATE-END 2005-02-10T18:31:46 Observation end date RA PNT 332.27743327645 Pointing RA DEC PNT 45.763584009502 Pointing Dec ROLL PNT 351.32376944852 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T23:28:18 Date and time of file creation DATE-OBS 2005-02-10T18:06:37 Observation start date DATE-END 2005-02-10T18:31:46 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6037 Observation id SEQ NUM 290529 Sequence number RA NOM 332.27743327645 Nominal RA DEC NOM 45.763584009502 Nominal Dec ROLL NOM 351.32376944852 Nominal Roll

Summary Page Created:Wed February 22, 2006 18:30 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290529

Instrument: HRC Obs ID: 6037 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170117 45.742334 5240.000000 74.204849 70.615334 331.852984 45.853577 97.515175 19.890329 4.902643 331.835901 45.763367 82.684822 17.817631 4.640618 332.609305 45.680668 60.875000 14.492175 4.200543 331.866187 45.758698 69.708336 18.471062 3.773921 331.845278 45.820422 70.681252 19.476870 3.628984 332.599071 45.781806 48.321808 14.518919 3.328196 331.881471 45.856242 62.708332 19.722149 3.179589 332.049458 45.798439 26.077499 8.398326 3.105083