Summary Page Created:Wed February 22, 2006 18:34 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290530

Instrument: HRC Obs ID: 6038 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06038N002 full img2.fits hrcf06038N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 18:34 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290530

Instrument: HRC Obs ID: 6038 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T23:07:28 Date and time of file creation DATE-OBS 2005-02-10T18:31:46 Observation start date DATE-END 2005-02-10T18:56:56 Observation end date RA PNT 332.42019988502 Pointing RA DEC PNT 45.748290077969 Pointing Dec ROLL PNT 351.18380874352 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T23:33:24 Date and time of file creation DATE-OBS 2005-02-10T18:31:46 Observation start date DATE-END 2005-02-10T18:56:56 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6038 Observation id SEQ NUM 290530 Sequence number RA NOM 332.42019988502 Nominal RA DEC NOM 45.748290077969 Nominal Dec ROLL NOM 351.18380874352 Nominal Roll

Summary Page Created:Wed February 22, 2006 18:34 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290530

Instrument: HRC Obs ID: 6038 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169940 45.742525 3926.027588 70.511757 55.679050 331.978804 45.754665 97.404465 19.678326 4.949835 331.994842 45.843269 90.933929 18.575907 4.895262 331.986529 45.786500 76.179466 20.551645 3.706733 332.057112 45.804474 56.606895 16.640650 3.401724 332.668021 45.764192 32.110344 9.449503 3.398099 332.692483 45.715602 38.541668 12.124716 3.178769 332.665698 45.773747 30.144827 9.938509 3.033134 331.988376 45.805377 58.875000 19.523733 3.015561 332.767172 45.743002 44.823528 14.866082 3.015154