Summary Page Created:Wed February 22, 2006 18:31 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290531

Instrument: HRC Obs ID: 6039 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06039N002 full img2.fits hrcf06039N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 18:31 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290531

Instrument: HRC Obs ID: 6039 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T23:05:48 Date and time of file creation DATE-OBS 2005-02-10T18:56:56 Observation start date DATE-END 2005-02-10T19:22:06 Observation end date RA PNT 331.94710558312 Pointing RA DEC PNT 45.798455267374 Pointing Dec ROLL PNT 351.73169119379 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T23:29:35 Date and time of file creation DATE-OBS 2005-02-10T18:56:56 Observation start date DATE-END 2005-02-10T19:22:06 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6039 Observation id SEQ NUM 290531 Sequence number RA NOM 331.94710558312 Nominal RA DEC NOM 45.798455267374 Nominal Dec ROLL NOM 351.73169119379 Nominal Roll

Summary Page Created:Wed February 22, 2006 18:31 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290531

Instrument: HRC Obs ID: 6039 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170310 45.742274 4511.317383 75.176025 60.010052 331.504909 45.793758 77.324997 16.867249 4.584328 331.522889 45.891662 60.241962 16.115885 3.738049 331.513492 45.842926 77.622322 21.373104 3.631776 331.521259 45.868879 78.120537 22.231655 3.513932 331.512574 45.830369 77.009819 22.019844 3.497292 331.568483 45.882545 55.846153 18.269638 3.056774