Summary Page Created:Wed February 22, 2006 18:52 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290532

Instrument: HRC Obs ID: 6040 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06040N002 full img2.fits hrcf06040N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 18:52 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290532

Instrument: HRC Obs ID: 6040 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T23:13:33 Date and time of file creation DATE-OBS 2005-02-10T19:22:06 Observation start date DATE-END 2005-02-10T19:47:16 Observation end date RA PNT 331.93291262802 Pointing RA DEC PNT 45.732768452297 Pointing Dec ROLL PNT 351.76124671925 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T23:51:06 Date and time of file creation DATE-OBS 2005-02-10T19:22:06 Observation start date DATE-END 2005-02-10T19:47:16 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6040 Observation id SEQ NUM 290532 Sequence number RA NOM 331.93291262802 Nominal RA DEC NOM 45.732768452297 Nominal Dec ROLL NOM 351.76124671925 Nominal Roll

Summary Page Created:Wed February 22, 2006 18:52 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290532

Instrument: HRC Obs ID: 6040 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170252 45.742642 3042.000000 61.388508 49.553249 332.169346 45.742970 2086.709961 61.864754 33.730190 332.158620 45.691138 124.772499 17.068069 7.310288 332.167581 45.730881 134.107498 19.171717 6.995070 332.160328 45.710562 115.055000 17.286528 6.655761 332.168313 45.730605 110.731033 19.335039 5.726962 331.491726 45.733172 84.653572 19.804653 4.274428 331.646318 45.784006 55.300892 13.493655 4.098289 331.516917 45.826253 74.155357 18.538980 3.999969 331.500473 45.777705 82.290176 20.907368 3.935942