Summary Page Created:Wed February 22, 2006 18:55 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290533

Instrument: HRC Obs ID: 6041 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06041N002 full img2.fits hrcf06041N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 18:55 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290533

Instrument: HRC Obs ID: 6041 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T23:21:29 Date and time of file creation DATE-OBS 2005-02-10T19:47:16 Observation start date DATE-END 2005-02-10T20:24:24 Observation end date RA PNT 332.40590386031 Pointing RA DEC PNT 45.683250962591 Pointing Dec ROLL PNT 351.25143155007 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T23:53:51 Date and time of file creation DATE-OBS 2005-02-10T19:47:16 Observation start date DATE-END 2005-02-10T20:24:24 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6041 Observation id SEQ NUM 290533 Sequence number RA NOM 332.40590386031 Nominal RA DEC NOM 45.683250962591 Nominal Dec ROLL NOM 351.25143155007 Nominal Roll

Summary Page Created:Wed February 22, 2006 18:55 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290533

Instrument: HRC Obs ID: 6041 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169913 45.742265 5624.565430 82.782562 67.943848 332.170201 45.743645 607.465881 74.367622 8.168419 332.167900 45.741757 467.704559 74.512451 6.276865 331.965328 45.684221 90.487503 19.648252 4.605371 331.981645 45.777549 82.850891 18.170082 4.559742 331.975236 45.752800 70.764282 19.637707 3.603490 331.973992 45.740386 73.594643 21.224211 3.467485 331.972676 45.714917 70.148216 22.086716 3.176036 332.566789 45.716021 20.020689 6.557534 3.053082