Summary Page Created:Tue February 28, 2006 16:47 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590369

Instrument: ACIS Obs ID: 6042 Source: E0102-72[S3,-120,1,0,0] PI: Dr. CXC Calibration Title: AO6B ACIS-S Calibration Observations of E0102-72

acisf06042N002 full img2.fits acisf06042N002 cntr img2.fits

Summary Page Created:Tue February 28, 2006 16:47 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590369

Instrument: ACIS Obs ID: 6042 Source: E0102-72[S3,-120,1,0,0] PI: Dr. CXC Calibration Title: AO6B ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-28T20:54:34 Date and time of file creation DATE-OBS 2005-04-12T01:41:42 Observation start date DATE-END 2005-04-12T07:40:24 Observation end date RA PNT 16.05132971399 Pointing RA DEC PNT -72.031352917796 Pointing Dec ROLL PNT 175.71418413306 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-28T21:45:34 Date and time of file creation DATE-OBS 2005-04-12T01:41:42 Observation start date DATE-END 2005-04-12T07:40:24 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S3,-120,1,0,0] Source name TITLE AO6B ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6042 Observation id SEQ NUM 590369 Sequence number RA NOM 16.05132971399 Nominal RA DEC NOM -72.031352917796 Nominal Dec ROLL NOM 175.71418413306 Nominal Roll

Summary Page Created:Tue February 28, 2006 16:47 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590369

Instrument: ACIS Obs ID: 6042 Source: E0102-72[S3,-120,1,0,0] PI: Dr. CXC Calibration Title: AO6B ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906396 -72.025886 500.477264 23.743223 21.078741 16.015884 -72.034640 959.428589 69.942345 13.717422 15.403747 -72.072450 451.867096 36.335102 12.436104 16.017663 -72.033808 846.714294 70.602310 11.992727 16.008741 -72.032147 553.714294 47.660530 11.617879 15.999133 -72.028350 709.714294 63.918198 11.103477 15.406319 -72.070495 371.770538 33.781708 11.005084 16.003515 -72.034845 763.428589 73.253029 10.421802 15.996504 -72.031333 660.142883 64.720375 10.199924 16.019312 -72.032728 740.714294 73.361679 10.096746