Summary Page Created:Tue February 28, 2006 18:44 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590370

Instrument: ACIS Obs ID: 6043 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO6B ACIS-S Calibration Observations of E0102-72

acisf06043N002 full img2.fits acisf06043N002 cntr img2.fits

Summary Page Created:Tue February 28, 2006 18:44 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590370

Instrument: ACIS Obs ID: 6043 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO6B ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-28T23:19:58 Date and time of file creation DATE-OBS 2005-04-18T08:44:20 Observation start date DATE-END 2005-04-18T11:26:49 Observation end date RA PNT 15.945094558886 Pointing RA DEC PNT -72.026768128525 Pointing Dec ROLL PNT 169.86930031288 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-28T23:43:19 Date and time of file creation DATE-OBS 2005-04-18T08:44:20 Observation start date DATE-END 2005-04-18T11:26:49 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S3,-120,-1,0,0] Source name TITLE AO6B ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6043 Observation id SEQ NUM 590370 Sequence number RA NOM 15.945094558886 Nominal RA DEC NOM -72.026768128525 Nominal Dec ROLL NOM 169.86930031288 Nominal Roll

Summary Page Created:Tue February 28, 2006 18:44 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590370

Instrument: ACIS Obs ID: 6043 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO6B ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906462 -72.025870 1020.857117 34.360867 29.709877 16.015942 -72.034689 425.428558 45.355751 9.379816 16.003584 -72.034695 410.857147 48.444298 8.481022 16.020340 -72.031419 335.857147 40.616875 8.268907 16.017919 -72.033630 356.142853 46.009682 7.740606 16.008844 -72.031995 243.000000 31.648258 7.678148 15.015757 -71.913289 241.305649 31.564053 7.644951 15.999147 -72.028388 319.571442 42.261047 7.561843 16.018794 -72.032773 349.285706 46.493450 7.512579 16.013288 -72.035227 296.571442 40.682442 7.289912