Summary Page Created:Sat April 8, 2006 15:59 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590376

Instrument: ACIS Obs ID: 6049 Source: E0102-72[I3,-120,-7,0.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

acisf06049N002 full img2.fits acisf06049N002 cntr img2.fits

Summary Page Created:Sat April 8, 2006 15:59 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590376

Instrument: ACIS Obs ID: 6049 Source: E0102-72[I3,-120,-7,0.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-08T19:30:20 Date and time of file creation DATE-OBS 2004-12-13T01:12:36 Observation start date DATE-END 2004-12-13T03:37:39 Observation end date RA PNT 16.184253392894 Pointing RA DEC PNT -72.140815927764 Pointing Dec ROLL PNT 301.30541101312 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.76843262 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-08T19:58:09 Date and time of file creation DATE-OBS 2004-12-13T01:12:36 Observation start date DATE-END 2004-12-13T03:37:39 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-7,0.5,0] Source name TITLE AO6A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6049 Observation id SEQ NUM 590376 Sequence number RA NOM 16.184253392894 Nominal RA DEC NOM -72.140815927764 Nominal Dec ROLL NOM 301.30541101312 Nominal Roll

Summary Page Created:Sat April 8, 2006 15:59 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590376

Instrument: ACIS Obs ID: 6049 Source: E0102-72[I3,-120,-7,0.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.003453 -72.034526 1176.993164 67.226646 17.507835 16.004552 -72.027644 1138.102295 65.879799 17.275436 16.020251 -72.032589 1017.579285 60.397980 16.847902 16.019828 -72.028810 806.284119 57.254520 14.082453 15.997643 -72.032447 791.806824 69.588547 11.378407 15.807985 -72.153921 165.103455 15.263898 10.816598 16.290301 -72.196360 79.477272 10.781405 7.371698 16.864700 -71.892841 117.146278 22.676254 5.166033 16.387467 -72.225184 43.692501 8.547021 5.112015 16.941095 -71.930491 93.863785 24.020645 3.907630