Summary Page Created:Sat April 8, 2006 16:23 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590377

Instrument: ACIS Obs ID: 6050 Source: E0102-72[I3,-120,-4,0.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

acisf06050N002 full img2.fits acisf06050N002 cntr img2.fits

Summary Page Created:Sat April 8, 2006 16:23 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590377

Instrument: ACIS Obs ID: 6050 Source: E0102-72[I3,-120,-4,0.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-08T19:43:06 Date and time of file creation DATE-OBS 2004-12-13T03:37:39 Observation start date DATE-END 2004-12-13T06:02:53 Observation end date RA PNT 16.099963262871 Pointing RA DEC PNT -72.098026253166 Pointing Dec ROLL PNT 301.13203320344 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 154.09092712 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-08T20:22:35 Date and time of file creation DATE-OBS 2004-12-13T03:37:39 Observation start date DATE-END 2004-12-13T06:02:53 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-4,0.5,0] Source name TITLE AO6A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6050 Observation id SEQ NUM 590377 Sequence number RA NOM 16.099963262871 Nominal RA DEC NOM -72.098026253166 Nominal Dec ROLL NOM 301.13203320344 Nominal Roll

Summary Page Created:Sat April 8, 2006 16:23 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590377

Instrument: ACIS Obs ID: 6050 Source: E0102-72[I3,-120,-4,0.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906188 -72.025909 331.795441 19.880486 16.689505 16.014915 -72.034973 434.428558 42.792156 10.152061 16.019755 -72.032969 459.000000 47.500965 9.662962 16.002723 -72.034590 461.714294 49.537018 9.320591 15.999212 -72.028165 402.714294 43.370689 9.285401 16.011530 -72.035184 312.714294 39.669319 7.883027 16.290590 -72.196360 76.062073 11.046794 6.885443 16.020368 -72.031386 264.428558 40.423428 6.541469 15.995934 -72.031285 270.285706 41.432869 6.523461 15.807642 -72.153912 63.692501 9.782299 6.510995