Summary Page Created:Thu February 16, 2006 13:40 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590378

Instrument: ACIS Obs ID: 6051 Source: E0102-72[I3,-120,-0.5,0.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

acisf06051N002 full img2.fits acisf06051N002 cntr img2.fits

Summary Page Created:Thu February 16, 2006 13:40 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590378

Instrument: ACIS Obs ID: 6051 Source: E0102-72[I3,-120,-0.5,0.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-16T18:17:40 Date and time of file creation DATE-OBS 2005-01-12T04:29:06 Observation start date DATE-END 2005-01-12T09:52:17 Observation end date RA PNT 15.976842899637 Pointing RA DEC PNT -72.044546120235 Pointing Dec ROLL PNT 269.80584426459 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-16T18:39:43 Date and time of file creation DATE-OBS 2005-01-12T04:29:06 Observation start date DATE-END 2005-01-12T09:52:17 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-0.5,0.5,0] Source name TITLE AO6A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6051 Observation id SEQ NUM 590378 Sequence number RA NOM 15.976842899637 Nominal RA DEC NOM -72.044546120235 Nominal Dec ROLL NOM 269.80584426459 Nominal Roll

Summary Page Created:Thu February 16, 2006 13:40 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590378

Instrument: ACIS Obs ID: 6051 Source: E0102-72[I3,-120,-0.5,0.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906515 -72.025920 459.142853 23.398695 19.622583 15.808442 -72.153957 484.275848 25.006651 19.365883 15.807294 -72.154178 277.897736 24.154263 11.505121 16.015858 -72.034725 495.285706 46.274147 10.703292 16.960936 -71.942919 387.896271 39.981609 9.701868 16.017681 -72.033890 419.571442 45.858150 9.149332 16.975601 -72.061070 274.402008 33.463703 8.199989 16.008716 -72.032228 256.857147 33.718044 7.617795 16.003490 -72.034734 371.142853 49.302208 7.527916 15.997153 -72.031165 334.285706 44.684910 7.480953