Summary Page Created:Sat April 8, 2006 17:13 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590379

Instrument: ACIS Obs ID: 6052 Source: E0102-72[I3,-120,-4.0,2.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

acisf06052N002 full img2.fits acisf06052N002 cntr img2.fits

Summary Page Created:Sat April 8, 2006 17:13 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590379

Instrument: ACIS Obs ID: 6052 Source: E0102-72[I3,-120,-4.0,2.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-08T20:10:03 Date and time of file creation DATE-OBS 2004-12-14T09:00:34 Observation start date DATE-END 2004-12-14T11:52:55 Observation end date RA PNT 16.000914306801 Pointing RA DEC PNT -72.115101435628 Pointing Dec ROLL PNT 299.81981884294 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-08T21:11:57 Date and time of file creation DATE-OBS 2004-12-14T09:00:34 Observation start date DATE-END 2004-12-14T11:52:55 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-4.0,2.5,0] Source name TITLE AO6A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6052 Observation id SEQ NUM 590379 Sequence number RA NOM 16.000914306801 Nominal RA DEC NOM -72.115101435628 Nominal Dec ROLL NOM 299.81981884294 Nominal Roll

Summary Page Created:Sat April 8, 2006 17:13 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590379

Instrument: ACIS Obs ID: 6052 Source: E0102-72[I3,-120,-4.0,2.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906263 -72.025857 344.193176 20.458429 16.824028 16.018898 -72.033086 787.458313 49.875580 15.788454 16.000655 -72.028253 624.833313 49.587322 12.600667 16.009623 -72.026927 488.708344 47.120697 10.371415 15.405663 -72.072023 155.333328 15.105579 10.283175 15.996714 -72.031597 492.000000 48.101223 10.228431 16.014948 -72.035085 396.857147 39.799381 9.971440 16.004334 -72.035128 387.000000 44.610096 8.675166 16.020623 -72.029595 341.916656 44.190571 7.737322 16.008936 -72.032330 248.500000 35.246334 7.050378